By: Stephany

In reply to Lisa of Lisa’s Yarns.

OMG, it was probably the scariest thing I have ever seen on a football field! I was really worried he was going to have a really bad TBI because he wasn’t even moving when he left the field. It was such a relief to find out he was able to be released from the hospital and travel home with the team. It was hard to watch the rest of the game because I just kept thinking about how brutal this game is and how we don’t take concussions as seriously as they need to be.